Table 254: Muons in Sodium nitrate NaNO_3

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.49415 2.261 114.6 0.09391 3.5097 0.1534 2.8221 3.6502 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 6.702 6.702 8.281 × 10^{−1} 14.0 MeV 5.616 × 10^1 5.239 5.239 1.510 × 10^0 20.0 MeV 6.802 × 10^1 4.100 4.100 2.820 × 10^0 30.0 MeV 8.509 × 10^1 3.187 3.187 5.624 × 10^0 40.0 MeV 1.003 × 10^2 2.726 2.726 9.039 × 10^0 80.0 MeV 1.527 × 10^2 2.053 2.053 2.648 × 10^1 100. MeV 1.764 × 10^2 1.927 1.927 3.656 × 10^1 140. MeV 2.218 × 10^2 1.800 1.800 5.814 × 10^1 200. MeV 2.868 × 10^2 1.729 1.729 9.228 × 10^1 298. MeV 3.894 × 10^2 1.705 0.000 1.705 Minimum ionization 300. MeV 3.917 × 10^2 1.705 0.000 1.705 1.507 × 10^2 400. MeV 4.945 × 10^2 1.714 0.000 1.714 2.092 × 10^2 800. MeV 8.995 × 10^2 1.787 0.000 0.000 1.787 4.377 × 10^2 1.00 GeV 1.101 × 10^3 1.819 0.000 0.000 1.819 5.486 × 10^2 1.40 GeV 1.502 × 10^3 1.870 0.000 0.000 0.001 1.871 7.653 × 10^2 2.00 GeV 2.103 × 10^3 1.926 0.001 0.000 0.001 1.928 1.081 × 10^3 3.00 GeV 3.104 × 10^3 1.990 0.001 0.001 0.001 1.993 1.590 × 10^3 4.00 GeV 4.104 × 10^3 2.034 0.002 0.001 0.002 2.039 2.086 × 10^3 8.00 GeV 8.105 × 10^3 2.135 0.004 0.004 0.004 2.147 3.992 × 10^3 10.0 GeV 1.011 × 10^4 2.165 0.005 0.005 0.005 2.181 4.916 × 10^3 14.0 GeV 1.411 × 10^4 2.209 0.008 0.009 0.006 2.233 6.727 × 10^3 20.0 GeV 2.011 × 10^4 2.254 0.013 0.015 0.009 2.291 9.378 × 10^3 30.0 GeV 3.011 × 10^4 2.302 0.021 0.026 0.013 2.362 1.367 × 10^4 40.0 GeV 4.011 × 10^4 2.334 0.030 0.038 0.017 2.420 1.785 × 10^4 80.0 GeV 8.011 × 10^4 2.409 0.068 0.091 0.034 2.602 3.377 × 10^4 100. GeV 1.001 × 10^5 2.432 0.088 0.120 0.042 2.682 4.134 × 10^4 140. GeV 1.401 × 10^5 2.467 0.130 0.181 0.058 2.835 5.584 × 10^4 200. GeV 2.001 × 10^5 2.503 0.195 0.276 0.082 3.057 7.621 × 10^4 300. GeV 3.001 × 10^5 2.544 0.307 0.438 0.123 3.413 1.072 × 10^5 400. GeV 4.001 × 10^5 2.573 0.423 0.607 0.164 3.767 1.350 × 10^5 800. GeV 8.001 × 10^5 2.644 0.907 1.307 0.331 5.190 2.251 × 10^5 830. GeV 8.297 × 10^5 2.648 0.944 1.360 0.344 5.296 Muon critical energy 1.00 TeV 1.000 × 10^6 2.667 1.156 1.669 0.416 5.909 2.612 × 10^5 1.40 TeV 1.400 × 10^6 2.702 1.659 2.388 0.590 7.339 3.219 × 10^5 2.00 TeV 2.000 × 10^6 2.739 2.429 3.489 0.854 9.512 3.935 × 10^5 3.00 TeV 3.000 × 10^6 2.783 3.720 5.322 1.309 13.133 4.826 × 10^5 4.00 TeV 4.000 × 10^6 2.814 5.032 7.179 1.770 16.796 5.498 × 10^5 8.00 TeV 8.000 × 10^6 2.891 10.340 14.655 3.693 31.580 7.207 × 10^5 10.0 TeV 1.000 × 10^7 2.916 13.022 18.420 4.683 39.042 7.775 × 10^5 14.0 TeV 1.400 × 10^7 2.954 18.375 25.922 6.722 53.974 8.643 × 10^5 20.0 TeV 2.000 × 10^7 2.996 26.468 37.235 9.852 76.551 9.572 × 10^5 30.0 TeV 3.000 × 10^7 3.044 39.936 56.061 15.282 114.324 1.063 × 10^6 40.0 TeV 4.000 × 10^7 3.078 53.470 74.946 20.853 152.348 1.139 × 10^6 80.0 TeV 8.000 × 10^7 3.163 107.742 150.547 44.210 305.663 1.321 × 10^6 100. TeV 1.000 × 10^8 3.191 134.950 188.391 56.310 382.842 1.379 × 10^6