Table 178: Muons in n-Hexane C_6H_{14}

⟨Z/A⟩ ρ [g/cm^3] I [eV] a k = m_s x_0 x_1 C δ_0 0.59020 0.660 54.0 0.11085 3.5027 0.1984 2.5757 3.2156 0.00

T p Ionization Brems Pair prod Photonucl Total CSDA range [MeV/c] [MeV cm^2/g] [g/cm^2]

10.0 MeV 4.704 × 10^1 8.828 8.828 6.242 × 10^{−1} 14.0 MeV 5.616 × 10^1 6.876 6.876 1.143 × 10^0 20.0 MeV 6.802 × 10^1 5.362 5.362 2.143 × 10^0 30.0 MeV 8.509 × 10^1 4.154 4.154 4.291 × 10^0 40.0 MeV 1.003 × 10^2 3.543 3.543 6.915 × 10^0 80.0 MeV 1.527 × 10^2 2.654 2.654 2.038 × 10^1 100. MeV 1.764 × 10^2 2.491 2.491 2.817 × 10^1 140. MeV 2.218 × 10^2 2.317 2.317 4.491 × 10^1 200. MeV 2.868 × 10^2 2.216 2.216 7.149 × 10^1 300. MeV 3.917 × 10^2 2.175 0.000 2.175 1.172 × 10^2 328. MeV 4.211 × 10^2 2.174 0.000 2.174 Minimum ionization 400. MeV 4.945 × 10^2 2.179 0.000 2.179 1.631 × 10^2 800. MeV 8.995 × 10^2 2.255 0.000 0.000 2.255 3.436 × 10^2 1.00 GeV 1.101 × 10^3 2.290 0.000 0.000 2.291 4.316 × 10^2 1.40 GeV 1.502 × 10^3 2.348 0.000 0.001 2.349 6.039 × 10^2 2.00 GeV 2.103 × 10^3 2.412 0.000 0.000 0.001 2.413 8.558 × 10^2 3.00 GeV 3.104 × 10^3 2.484 0.001 0.000 0.001 2.487 1.264 × 10^3 4.00 GeV 4.104 × 10^3 2.535 0.001 0.001 0.002 2.539 1.661 × 10^3 8.00 GeV 8.105 × 10^3 2.651 0.003 0.003 0.004 2.660 3.196 × 10^3 10.0 GeV 1.011 × 10^4 2.686 0.004 0.004 0.005 2.699 3.942 × 10^3 14.0 GeV 1.411 × 10^4 2.738 0.006 0.006 0.007 2.756 5.408 × 10^3 20.0 GeV 2.011 × 10^4 2.790 0.009 0.010 0.009 2.818 7.559 × 10^3 30.0 GeV 3.011 × 10^4 2.846 0.014 0.018 0.014 2.892 1.106 × 10^4 40.0 GeV 4.011 × 10^4 2.885 0.020 0.026 0.018 2.950 1.448 × 10^4 80.0 GeV 8.011 × 10^4 2.974 0.047 0.063 0.035 3.119 2.765 × 10^4 100. GeV 1.001 × 10^5 3.002 0.061 0.083 0.043 3.189 3.399 × 10^4 140. GeV 1.401 × 10^5 3.043 0.090 0.125 0.060 3.318 4.628 × 10^4 200. GeV 2.001 × 10^5 3.087 0.135 0.191 0.085 3.499 6.388 × 10^4 300. GeV 3.001 × 10^5 3.136 0.214 0.305 0.128 3.782 9.136 × 10^4 400. GeV 4.001 × 10^5 3.170 0.296 0.423 0.170 4.060 1.169 × 10^5 800. GeV 8.001 × 10^5 3.255 0.639 0.917 0.343 5.154 2.041 × 10^5 1.00 TeV 1.000 × 10^6 3.282 0.816 1.173 0.431 5.703 2.410 × 10^5 1.34 TeV 1.344 × 10^6 3.319 1.122 1.610 0.586 6.638 Muon critical energy 1.40 TeV 1.400 × 10^6 3.324 1.173 1.683 0.612 6.792 3.052 × 10^5 2.00 TeV 2.000 × 10^6 3.369 1.723 2.465 0.886 8.443 3.843 × 10^5 3.00 TeV 3.000 × 10^6 3.421 2.646 3.768 1.358 11.193 4.868 × 10^5 4.00 TeV 4.000 × 10^6 3.458 3.586 5.091 1.838 13.973 5.666 × 10^5 8.00 TeV 8.000 × 10^6 3.549 7.398 10.421 3.839 25.208 7.768 × 10^5 10.0 TeV 1.000 × 10^7 3.580 9.329 13.106 4.871 30.885 8.484 × 10^5 14.0 TeV 1.400 × 10^7 3.625 13.183 18.456 6.997 42.261 9.586 × 10^5 20.0 TeV 2.000 × 10^7 3.675 19.017 26.527 10.266 59.486 1.078 × 10^6 30.0 TeV 3.000 × 10^7 3.732 28.736 39.953 15.944 88.366 1.215 × 10^6 40.0 TeV 4.000 × 10^7 3.773 38.512 53.425 21.774 117.486 1.313 × 10^6 80.0 TeV 8.000 × 10^7 3.875 77.713 107.361 46.269 235.219 1.549 × 10^6 100. TeV 1.000 × 10^8 3.909 97.367 134.363 58.976 294.615 1.625 × 10^6