Table 300: b(E) × 10^6 [cm^2g^{−1}] for Sodium chloride (NaCl)

⟨Z/A⟩ = 0.55509

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.5118 0.2394 0.4355 1.1867 5. 0.6957 0.5856 0.4633 1.7445 10. 0.8453 0.8639 0.4515 2.1607 20. 1.0003 1.1592 0.4327 2.5921 50. 1.2067 1.5793 0.4118 3.1977 100. 1.3569 1.8707 0.4016 3.6293 200. 1.4981 2.1388 0.3966 4.0335 500. 1.6620 2.3993 0.3962 4.4574 1000. 1.7648 2.5472 0.4026 4.7146 2000. 1.8482 2.6539 0.4131 4.9151 5000. 1.9291 2.7456 0.4324 5.1070 10000. 1.9710 2.7887 0.4519 5.2115 20000. 2.0007 2.8160 0.4745 5.2912 50000. 2.0240 2.8380 0.5100 5.3720 100000. 2.0354 2.8470 0.5403 5.4227