Table 293: b(E) × 10^6 [cm^2g^{−1}] for Solid carbon dioxide (dry ice; CO_2) ⟨Z/A⟩ = 0.49989

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2937 0.1301 0.4624 0.8862 5. 0.3979 0.3196 0.4897 1.2072 10. 0.4837 0.4799 0.4755 1.4391 20. 0.5737 0.6545 0.4541 1.6823 50. 0.6956 0.9004 0.4307 2.0268 100. 0.7860 1.0743 0.4194 2.2797 200. 0.8719 1.2342 0.4136 2.5197 500. 0.9730 1.3973 0.4128 2.7830 1000. 1.0374 1.4969 0.4196 2.9539 2000. 1.0907 1.5664 0.4308 3.0880 5000. 1.1436 1.6276 0.4517 3.2229 10000. 1.1714 1.6565 0.4728 3.3008 20000. 1.1908 1.6748 0.4975 3.3631 50000. 1.2074 1.6893 0.5361 3.4329 100000. 1.2151 1.6953 0.5693 3.4797