Table 288: b(E) × 10^6 [cm^2g^{−1}] for Liquid chlorine (Cl_2), Z = 17, A =35.453(2)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.5866 0.2765 0.4289 1.2920 5. 0.7980 0.6769 0.4568 1.9317 10. 0.9697 0.9963 0.4456 2.4117 20. 1.1473 1.3332 0.4274 2.9078 50. 1.3830 1.8134 0.4071 3.6035 100. 1.5542 2.1454 0.3972 4.0968 200. 1.7143 2.4518 0.3924 4.5584 500. 1.9001 2.7463 0.3920 5.0384 1000. 2.0163 2.9088 0.3983 5.3235 2000. 2.1101 3.0290 0.4086 5.5477 5000. 2.2008 3.1313 0.4275 5.7596 10000. 2.2476 3.1794 0.4466 5.8735 20000. 2.2807 3.2098 0.4688 5.9593 50000. 2.3065 3.2345 0.5035 6.0444 100000. 2.3191 3.2445 0.5331 6.0967