Table 188: b(E) × 10^6 [cm^2g^{−1}] for Lithium oxide Li_2O ⟨Z/A⟩ = 0.46952

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.2200 0.0958 0.4739 0.7898 5. 0.2986 0.2376 0.4999 1.0361 10. 0.3639 0.3608 0.4844 1.2091 20. 0.4330 0.4951 0.4618 1.3899 50. 0.5272 0.6837 0.4374 1.6484 100. 0.5976 0.8191 0.4256 1.8424 200. 0.6648 0.9418 0.4197 2.0263 500. 0.7442 1.0700 0.4188 2.2330 1000. 0.7952 1.1491 0.4258 2.3702 2000. 0.8376 1.2052 0.4374 2.4802 5000. 0.8799 1.2552 0.4590 2.5941 10000. 0.9024 1.2789 0.4807 2.6620 20000. 0.9182 1.2938 0.5062 2.7183 50000. 0.9317 1.3055 0.5463 2.7836 100000. 0.9380 1.3103 0.5806 2.8290