Table 143: b(E) × 10^6 [cm^2g^{−1}] for Chloroform (CHCl_3)

⟨Z/A⟩ = 0.48585

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.5479 0.2572 0.4341 1.2392 5. 0.7453 0.6301 0.4619 1.8372 10. 0.9058 0.9288 0.4502 2.2849 20. 1.0720 1.2445 0.4315 2.7479 50. 1.2929 1.6942 0.4107 3.3977 100. 1.4537 2.0055 0.4006 3.8597 200. 1.6041 2.2928 0.3956 4.2924 500. 1.7789 2.5701 0.3951 4.7442 1000. 1.8884 2.7242 0.4015 5.0142 2000. 1.9770 2.8378 0.4119 5.2267 5000. 2.0628 2.9348 0.4311 5.4288 10000. 2.1072 2.9804 0.4505 5.5381 20000. 2.1386 3.0092 0.4731 5.6210 50000. 2.1633 3.0326 0.5084 5.7042 100000. 2.1752 3.0421 0.5386 5.7559