Table 111: b(E) × 10^6 [cm^2g^{−1}] for B-100 Bone-equivalent plastic

⟨Z/A⟩ = 0.52740

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.3332 0.1495 0.4640 0.9468 5. 0.4527 0.3695 0.4913 1.3135 10. 0.5510 0.5539 0.4770 1.5819 20. 0.6540 0.7519 0.4553 1.8611 50. 0.7930 1.0319 0.4315 2.2565 100. 0.8961 1.2284 0.4199 2.5444 200. 0.9929 1.4094 0.4141 2.8164 500. 1.1069 1.5916 0.4132 3.1118 1000. 1.1796 1.6996 0.4199 3.2990 2000. 1.2393 1.7768 0.4311 3.4472 5000. 1.2984 1.8443 0.4520 3.5947 10000. 1.3296 1.8761 0.4731 3.6788 20000. 1.3516 1.8964 0.4979 3.7458 50000. 1.3700 1.9122 0.5367 3.8189 100000. 1.3784 1.9187 0.5701 3.8673