Table 058: b(E) × 10^6 [cm^2g^{−1}] for Cerium, Z = 58, A =140.116(1)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.4992 0.5391 0.3769 2.4152 5. 2.0698 1.6772 0.4026 4.1496 10. 2.5344 2.5592 0.3946 5.4882 20. 3.0111 3.4034 0.3751 6.7897 50. 3.6362 4.6705 0.3643 8.6710 100. 4.0822 5.5140 0.3566 9.9528 200. 4.4911 6.2672 0.3530 11.1112 500. 4.9529 6.9625 0.3531 12.2686 1000. 5.2331 7.3334 0.3586 12.9251 2000. 5.4525 7.6021 0.3674 13.4220 5000. 5.6576 7.8275 0.3833 13.8684 10000. 5.7599 7.9320 0.3992 14.0911 20000. 5.8280 8.0001 0.4177 14.2459 50000. 5.8846 8.0513 0.4466 14.3824 100000. 5.9100 8.0726 0.4712 14.4537