Table 054: b(E) × 10^6 [cm^2g^{−1}] for Xenon gas, Z = 54, A =131.293(6)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 1.3965 0.5319 0.3793 2.3077 5. 1.9264 1.5877 0.4051 3.9192 10. 2.3579 2.4061 0.3970 5.1609 20. 2.8006 3.1942 0.3774 6.3722 50. 3.3817 4.3737 0.3663 8.1217 100. 3.7965 5.1604 0.3586 9.3155 200. 4.1773 5.8639 0.3549 10.3962 500. 4.6081 6.5148 0.3551 11.4780 1000. 4.8700 6.8625 0.3606 12.0930 2000. 5.0753 7.1147 0.3694 12.5595 5000. 5.2677 7.3264 0.3855 12.9796 10000. 5.3639 7.4247 0.4016 13.1901 20000. 5.4280 7.4888 0.4202 13.3371 50000. 5.4813 7.5370 0.4493 13.4675 100000. 5.5052 7.5569 0.4742 13.5363