Table 033: b(E) × 10^6 [cm^2g^{−1}] for Arsenic, Z = 33, A =74.92160(2)

E [GeV] b_{brems} b_{pair} b_{nucl} b_{tot}

2. 0.9687 0.4454 0.4001 1.8143 5. 1.3275 1.1470 0.4273 2.9018 10. 1.6188 1.6942 0.4076 3.7206 20. 1.9181 2.2421 0.4022 4.5624 50. 2.3128 3.0488 0.3844 5.7459 100. 2.5962 3.5938 0.3758 6.5658 200. 2.8584 4.0870 0.3716 7.3170 500. 3.1583 4.5500 0.3716 8.0799 1000. 3.3427 4.8005 0.3775 8.5207 2000. 3.4892 4.9836 0.3869 8.8597 5000. 3.6283 5.1381 0.4042 9.1705 10000. 3.6986 5.2104 0.4215 9.3305 20000. 3.7461 5.2574 0.4416 9.4451 50000. 3.7857 5.2932 0.4730 9.5519 100000. 3.8038 5.3080 0.4998 9.6117