– 1–

ΔS = ΔQ IN K0 DECAYS

The relative amount of ΔS ≠ ΔQ component present is measured by the parameter x, defined as

x = A(K^0 → π�ℓ^+ν)/A(K^0 → π�ℓ^+ν) . We list Re{x} and Im{x} for Ke_3 and K¯_3 combined.

CITATION: C. Caso et al., The European Physical Journal C3, 1 (1998) and (URL: http://pdg.lbl.gov/) June 3, 1998 11:37