CITATION: R.M. Barnett et al. Physical Review D54, 1 (1996) and 1997 off-year partial update for the 1998 edition (URL: http://pdg.lbl.gov)

B^�_J (5732)^{I (JP) = ?(??)}_{I, J, P need confirmation.}

OMITTED FROM SUMMARY TABLE

Signal can be interpreted as stemming from several narrow and broad resonances. Needs confirmation.

B∗J (5732) MASS

VALUE (MeV) EVTS DOCUMENT ID TECN COMMENT

5698±12 OUR AVERAGE

5698±12 OUR AVERAGE Error includes scale factor of 1.6. See the ideogram below. 5704± 4±10 1944 1 BUSKULIC 96D ALEP Eeecm= 88–94 GeV 5732± 5±20 2157 ABREU 95B DLPH Eeecm= 88–94 GeV 5681±11 1738 AKERS 95E OPAL Eeecm= 88–94 GeV 1 Using m B ß−mB = 424 ± 4 ± 10 MeV.

B^∗_J(5732) mass (MeV)

B∗J (5732) WIDTH

VALUE (MeV) EVTS DOCUMENT ID TECN COMMENT

128±18 OUR AVERAGE 145±28 2157 ABREU 95B DLPH Eeecm= 88–94 GeV 116±24 1738 AKERS 95E OPAL Eeecm= 88–94 GeV

HTTP://PDG.LBL.GOV Page 1 Created: 9/11/1997 15:07

CITATION: R.M. Barnett et al. Physical Review D54, 1 (1996) and 1997 off-year partial update for the 1998 edition (URL: http://pdg.lbl.gov)

B∗J (5732) DECAY MODES

Mode Fraction (Γi /Γ)

Γ1 B∗ ß + B ß dominant

B∗J (5732) REFERENCES

BUSKULIC 96D ZPHY C69 393 +Casper, De Bonis, Decamp+ (ALEPH Collab.) ABREU 95B PL B345 598 + (DELPHI Collab.) AKERS 95E ZPHY C66 19 +Alexander, Allison+ (OPAL Collab.)

HTTP://PDG.LBL.GOV Page 2 Created: 9/11/1997 15:07