CITATION: R.M. Barnett et al. Physical Review D54, 1 (1996) and 1997 off-year partial update for the 1998 edition (URL: http://pdg.lbl.gov)

K^�_0(1950)^{I (JP ) = 1}2^{(0+)}

OMITTED FROM SUMMARY TABLE

Seen in partial-wave analysis of the K− ß+ system. Needs confirmation.

K ∗0(1950) MASS

VALUE (MeV) DOCUMENT ID TECN CHG COMMENT

1945±10±20

1945±10±20 1 ASTON 88 LASS 0 11 K− p → K− ß+ n 1 We take the central value of the two solutions and the larger error given.

K ∗0(1950) WIDTH

VALUE (MeV) DOCUMENT ID TECN CHG COMMENT

201±34±79

201±34±79 2 ASTON 88 LASS 0 11 K− p → K− ß+ n 2 We take the central value of the two solutions and the larger error given.

K ∗0(1950) DECAY MODES

Mode Fraction (Γi /Γ)

Γ1 K ß (52±14) %

K ∗0(1950) BRANCHING RATIOS Γ � K ß � /Γtotal Γ1/Γ Γ � � Γ � � Γ � � VALUE DOCUMENT ID TECN CHG COMMENT

0:52±0:08±0:12

0:52±0:08±0:12 3 ASTON 88 LASS 0 11 K− p → K− ß+ n 3 We take the central value of the two solutions and the larger error given.

K ∗0(1950) REFERENCES

ASTON 88 NP B296 493 +Awaji, Bienz, Bird+ (SLAC, NAGO, CINC, INUS)

HTTP://PDG.LBL.GOV Page 1 Created: 9/11/1997 15:02