– 1–

THE X(1900–3600) REGION

The high-mass region is covered nearly continuously with evidence for peaks of various widths having various decay modes. As a satisfactory grouping into particles is not yet possible, we list all the Y = 0 bumps coupled neither to N N nor to e+e�, and having M > 1900 MeV, together, ordered by increasing mass.

The narrow peaks observed in a missing-mass-spectrometer experiment at 1929, 2195, and 2382 MeV, called respectively S, T , and U by the authors (CHIKOVANI 66, FOCACCI 66), were not seen by ANTIPOV 72, who performed a similar experiment at 25 and 40 GeV/c.

CITATION: L. Montanet et al., Physical Review D50, 1173 (1994) and 1995 off-year partial update for the

1996 edition available on the PDG WWW pages (URL: http://pdg.lbl.gov/) October 19, 1995 09:37