1995 PARTIAL UPDATE TO THE REVIEW OF PARTICLE PROPERTIES*

B^�_s^{I (JP) = ?(??)}_{I, J, P need confirmation.}

OMITTED FROM SUMMARY TABLE

B^∗_s MASS

From mass difference below and the B0_s mass.

VALUE (MeV) DOCUMENT ID

5421±5 OUR FIT

5421±5 OUR FIT Error includes scale factor of 1.1.

m_B�_s � m_{Bs}

VALUE (MeV) DOCUMENT ID TECN COMMENT

47:0±2:6 OUR FIT 47:0±2:6

47:0±2:6 1 LEE-FRANZINI90 CSB2 e+ e− → Υ(5S) 1 LEE-FRANZINI 90 measure 46_:7 ± 0_:4 ± 0_:2 MeV for an admixture of_B0,_B+, and Bs . They use the shape of the photon line to separate the above value for B_s .

B^∗_s REFERENCES

LEE-FRANZINI 90 PRL 65 2947 +Heintz, Lovelock, Narain, Schamberger+ (CUSB II Collab.)

*CITATION: L. Montanet et al., Physical Review D50, 1173 (1994) and 1995 off-year partial update for the 1996 edition (URL: http://pdg.lbl.gov/)