– 1–

ΔS = ΔQ IN K0 DECAYS

The relative amount of ΔS ≠ ΔQ component present is measured by the parameter x, defined as

x = A(K^0 → π�ℓ^+ν)/A(K^0 → π�ℓ^+ν) . We list Re{x} and Im{x} for Ke_3 and K¯_3 combined.

CITATION: L. Montanet et al., Physical Review D50, 1173 (1994) and 1995 off-year partial update for the 1996 edition available on the PDG WWW pages (URL: http://pdg.lbl.gov/) October 18, 1995 14:47